Oneandtwo Entries 207265 Mean 0.9682 RMS 0.1131

W (GeV)

0.8 0.9 1 1.1 1.2 1.3 1.4 0 2000

4000

6000

8000

10000

12000

14000

16000

Oneandtwo

Seven Entries 51919 Mean 1.215 RMS 0.1303

W (GeV)

0.8 0.9 1 1.1 1.2 1.3 1.4 0

200

400

600

800 1000

1200

Seven

SinandCoin Entries 363093 Mean 1.043 RMS 0.1642

W (GeV)

0.8 0.9 1 1.1 1.2 1.3 1.4 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

SinandCoin