RES_1D_eL0 Entries 4451 Mean -0.01389 RMS 0.0465

-0.3 -0.2 -0.1 0 0.1 0.2 0.3 0

20

40

60

80

100

120 prot_momentum(p_theta)_eL RES_1D_eL1 Entries 4451 Mean -0.01835 RMS 0.02611

-0.3 -0.2 -0.1 0 0.1 0.2 0.3 0

50

100

150

200

250 RES_1D_eL1 elec_momentum(e_theta)_eL

RES_1D_eL2 Entries 4451 Mean -1.017 RMS 2.864

-15 -10 -5 0 5 10 15 0

20

40

60

80

100 proton_theta(p_momentum)_eL RES_1D_eL3 Entries 4451 Mean -3.217 RMS 4.267

-15 -10 -5 0 5 10 15 0 10 20 30 40 50 60 70 80 RES_1D_eL3 electron_theta(e_momentum)_eL