)^2

(GeV 2Q 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.2

0.3

0.4

0.5

0.6

0.7

0.8 < 0.1GeV M Left Sector , p < 0.1GeV M Right Sector, p < 0.15GeV M Left Sector , p < 0.15GeV M Right Sector, p

2 Beam-Vector Dilutions Versus Q