(GeV) Mm 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

0.042) GeV ± peak = (0.938

Missing Mass (Left Sector)

(GeV) Mm 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 0

1000

2000

3000

4000

5000

6000

7000

0.041) GeV ± peak = (0.941

Missing Mass (Right Sector)