Fri Jul 16 12:11:56 2004

= 32.0, 60.0 target dθ for 2 Asymmetry Vs. Q V ed d(e,e’p)n A

(GeV^2) 2Q 0.1 0.15 0.2 0.25 0.3 0.35

-0.25

-0.2

-0.15

-0.1

-0.05

0 Left Sector

Hydrogen Fit 0.016 ± dil = 0.535 Deuterium Fit 0.016 ± dil = 0.529

(GeV^2) 2Q 0.1 0.15 0.2 0.25 0.3 0.35

-0.25

-0.2

-0.15

-0.1

-0.05

0 Right Sector

Hydrogen Fit 0.015 ± dil = 0.524 Deuterium Fit 0.014 ± dil = 0.505