CMS pϕ Asymmetry Vs. T d d(e,e’p)n A

(deg) CMS pϕ -50 0 50 100 150 200 250

-0.04

-0.02

0

0.02

0.04

0.06

0.08

0.1 Left Sector

Real Data Monte Carlo

Projected Error

(deg) CMS pϕ -50 0 50 100 150 200 250

-0.04

-0.02

0

0.02

0.04

0.06

0.08

0.1 Right Sector

Real Data Monte Carlo

Projected Error