(GeV) Mp 0.3 0.320.34 0.36 0.38 0.4 0.42 0.44 0.460.48 0.5 0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Target Full Target Empty

Missing Momentum (Left Sector)

(GeV) Mp 0.3 0.320.34 0.36 0.38 0.4 0.42 0.44 0.460.48 0.5 0

0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

Target Full Target Empty

Missing Momentum (Right Sector)