Time (Day)

0 50 100 150 200 250

Beam Polarization (%)

40

50

60

70

80

90 Dec Jan Feb Mar Apr May Jun Jul

65.3% 67.4% 68.1% 66.2% 67.1% 62.8% 65.6%