W (GeV)

1.7 1.8 1.9 2 2.1 2.2 2.3 2.4 2.5

Counts / C

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08 Deuterium

D(e,e’n)p

+π,n^0π

D(e,e’n)p γ)pγ D(e,e’

Hydrogen Empty

Invariant Mass W