,e’)X Data Distribution e(p = 344779 events tot = 289479 C, Y totQ

)^2

W (GeV/c

1 1.1 1.2 1.3 1.4 1.5 1.6

)^2 counts/C/(GeV/c

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 W

)^2/c^2

Q2 (GeV

0 0.1 0.2 0.3 0.4 0.5

)^2/c^2 counts/C/(GeV

0 0.5 1 1.5 2 2.5 3

Q2

Ee (GeV)

0.1 0.2 0.3 0.4 0.5 0.6 0.7 counts/C/(GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Ee

THe (deg.)

20 40 60 80 100 120 counts/C/(deg.)

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016 THe