AL_W_MC

Entries 23 Mean 1.107 RMS 0.1565

W (GeV)

0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4

LA

-0.2

-0.15

-0.1

-0.05

-0

0.05

W LA_{AR_W_MC}

Entries 23 Mean 1.13 RMS 0.1338

W (GeV)

0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4

RA

-0.2

-0.1

0

0.1

0.2

0.3

AR_W_MC W RA H(e, e’): Monte Carlo Asymmetries