A_T_W_MC

Entries 10 Mean 1.117 RMS 0.1396

W (GeV)

0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4

T’A

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

TT’ A_{A_TL_W_MC}

Entries 10 Mean 1.047 RMS 0.1403

W (GeV)

0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4

TL’ A

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

A_TL_W_MC TL’ A for H(e,e’) TL’ , A T’A