0 50 100 150 200 250 300

-3000

-2500

-2000

-1500

-1000

-500

0

Y component of BField

0 50 100 150 200 250 300

0.85

0.9

0.95

1

1.05

1.1

1.15

Shielded/unShielded Field ratio_to_CC1