eTOFL_3

Entries 162570 Mean 3.32 RMS 3.463

TOF #, Left Sector

0 2 4 6 8 10 12 14

0.02

0.04

0.06

0.08

0.1

0.12

Electron TOF Left eThetaL_3_{Entries 162570}

Mean 35.47 RMS 11.06

eθ 20 30 40 50 60 70 80 0

0.005

0.01

0.015

0.02

0.025 eThetaL_3

Entries 162570

Electron Theta Left MM_3_0_{Entries 162570}

Mean 0.9464 RMS 0.05798

2/c^2

Missing Mass GeV

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

MM_3_0

Entries 162570

Missing Mass

eTOFR_3

Entries 41571 Mean 2.794 RMS 3.141

TOF #, Right Sector

0 2 4 6 8 10 12 14

0.005

0.01

0.015

0.02

0.025

0.03

Electron TOF Right^{eThetaR_3}_{Entries 41571}

Mean 33.31 RMS 9.784

eθ 20 30 40 50 60 70 80

0.001

0.002

0.003

0.004

0.005

0.006 eThetaR_3

Entries 41571

Electron Theta Right^{MM_3_1}_{Entries 41571}

Mean 0.9406 RMS 0.04947

2/c^2

Missing Mass GeV

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 0

0.002

0.004

0.006

0.008

0.01

MM_3_1

Entries 41571

Missing Mass