eTOFL_3

Entries 942572 Mean 6.36 RMS 4.559

TOF #, Left Sector

0 2 4 6 8 10 12 14

0.05 0.1 0.15 0.2 0.25 0.3 0.35

Electron TOF Left eThetaL_3_{Entries 942572}

Mean 51.65 RMS 16.44

eθ 20 30 40 50 60 70 80

0.01

0.02

0.03

0.04

0.05

0.06 eThetaL_3

Entries 942572

Electron Theta Left MM_3_0_{Entries 942572}

Mean 0.9708 RMS 0.08338

2/c^2

Missing Mass GeV

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 0

0.01

0.02

0.03

MM_3_0

Entries 942572

Missing Mass

eTOFR_3

Entries 126032 Mean 5.083 RMS 4.429

TOF #, Right Sector

0 2 4 6 8 10 12 14

0.01

0.02

0.03

0.04

0.05

0.06

Electron TOF Right^{eThetaR_3}_{Entries 126032}

Mean 44.09 RMS 16.15

eθ 20 30 40 50 60 70 80

0.01 eThetaR_3

Entries 126032

Electron Theta Right^{MM_3_1}_{Entries 126032}

Mean 0.9533 RMS 0.06942

2/c^2

Missing Mass GeV

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 0

0.01

MM_3_1

Entries 126032

Missing Mass