htemp Entries 4586823 Mean 0.0221 RMS 0.01812

0 0.02 0.04 0.06 0.08 0.1 0

2000

4000

6000

8000

10000 110 × Mm {abs(fwl-fwr+180)<2.0}

Missing Mass

elastic ep