h Entries 4586823 Mean -0.0002232 RMS 0.0007779

-0.003 -0.002 -0.001 0 0.001 0.002 0.003 0

2000

4000

6000

8000

210 × h Em*Em - pm*pm {abs(fwl-fwr+180)<2.0} h5

Entries 4586823 Mean 0.02812 RMS 0.01582

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

5000 h5 pm {abs(fwl-fwr+180)<2.0}