E0_EL

Entries 299803

Mean 34.18

RMS 9.102

eθ 30 40 50 60 70

GeV

0.7

0.75

0.8

0.85

0.9

E0_EL

Electrons - MASCARAD

Beam Energy Reconstructed from Elec.

E0_PR

Entries 302707 Mean 59.7 RMS 6.701

pθ 30 35 40 45 50 55 60 65 70

GeV

0.7

0.75

0.8

0.85

0.9

E0_PR

Protons