E0_EL

Entries 345079 Mean 34.12 RMS 9.209

eθ 20 30 40 50 60 70 80

GeV

0.78

0.8

0.82

0.84

0.86

0.88

0.9

0.92

0.94

E0_EL

Electrons - No MASCARAD

E0_PR

Entries 336369 Mean 59.91 RMS 6.696

pθ 30 40 50 60 70

GeV

0.78

0.8

0.82

0.84

0.86

0.88

0.9

0.92

0.94

E0_PR

Protons