te_L Entries 203285 Mean 33.78 RMS 8.977

eθ 30 40 50 60 70 80 eθΔ

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 (crun) eθ ) vs.

e(p_eθ

(crunched MC) - eθ electron left sector MASCARAD included

te_R Entries 207514 Mean 33.66 RMS 8.966

eθ 30 40 50 60 70 80 eθΔ

-2

-1

0

1

2

3 electron right sector theta

pe_L Entries 203285 Mean 0.7319 RMS 0.05371

GeV/c ep 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 epΔ

-0.02

-0.01 0 0.01

0.02

0.03

0.04

electron left sector

(crun) e ) vs. p eθ(_e

(crunched MC) - p ep

pe_R Entries 207514 Mean 0.7337 RMS 0.05385

GeV/c ep 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 epΔ

-0.02

-0.01

0

0.01

0.02

0.03

electron right sector momentum