htemp Entries 328021 Mean 0.9759 RMS 0.07363

W 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0 2000

4000

6000

8000

10000

12000

14000

sqrt((0.85-pwl+0.938272)**2-0.85*(0.85-2.*pwl*cos(twl*0.01745))-pwl**2) {qwl==-1&&qwr==1}

Invariant Mass

MASCARAD

No MASCARAD