0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

2000

4000

6000

8000

10000

12000

Invariant Mass No MASCARAD MASCARAD

Left

H2 data e

Right

H2 data e

Invariant Mass