0.4 0.5 0.6 0.7 0.8 0.9

-0.002

-0.001 0 0.001

0.002

0.003

0.004

0.005

0.006

Graph

p (Eloss-ON) vs. p p (Eloss-OFF) - p pp

0.5 0.55 0.6 0.65 0.7 0.75 0.8

-0.005

0

0.005

0.01

0.015

Graph

e (Eloss ON) vs. p p (Eloss OFF) - e ep

20 30 40 50 60 70 80

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

0.012

Graph

pθ (Eloss ON) vs. p (Eloss OFF) - p pp

20 30 40 50 60 70 80

-0.004

-0.002 0 0.002

0.004

0.006

0.008

Graph

eθ (Eloss on) vs. e (Eloss OFF) - p ep