eθ 20 30 40 50 60 70 80 90

0.75

0.8

0.85

0.9

0.95

)_eθ,_e(p_0E

Left

New Recrunch e

Right

New Recrunch e

Left

H2 data e

Right

H2 data e

Beam Energy Reconstruction

pθ 30 40 50 60 70

0.7

0.75

0.8

0.85

0.9

0.95

1

1.05 )_pθ,_p(p_0E

Right

New Recrunch p

Left

New Recrunch p

Right

H2 data p

Left

H2 data p

Beam Energy Reconstruction