hTHeL1_recrunch Entries 3001570 Mean 37.5 RMS 11.02

10 20 30 40 50 60 70 80 90 0

2000

4000

6000

8000

10000 1 x10 Theta Electron Left v3_4_17_{hTHeR1_recrunch}

Entries 3795130 Mean 36.34 RMS 10.47

10 20 30 40 50 60 70 80 90 0

200

400

600

800

1000

1200

1400 2 x10 hTHeR1_recrunch

Theta Electron Right V3_4_17