(cm)

BLAST Z -20 -15 -10 -5 0 5 10 15 20

Bθ

42 44 46 48 50 52 54 56 58 Spin Angle Measurements January 2005 survey June 2005 survey March 2006 survey Compass Measurements (0.9 cm) Compass Measurements (1.8 cm) = 48.84

nominal θ Final Spin Profile at

Graph

Spin Profile Measurements o47